A DOUBLE TRAGEDY
source date: 1891
availability: public-domain

A DOUBLE TRAGEDY A most lamentable double tragedy was en- acted at Bald Knob on the 17th instant. On train No. 53 there was a passenger by the name of John W. Graeter, who had exhibited signs of insanity to such an extent that Pullman con- ductor E. W. Leach, in whose car Graeter was, spoke about the matter, saying he was afraid that he (Graeter) would harm some one before they would get through. It was not known where he was going, but no harm was done until after the Memphis train had got in and “53” had taken on the passengers for the south and was pulling by the station. When not more than ten rods from it, bystanders on the platform saw the brakeman and Pullman conductor run out of the Pullman car, and following them was a man with a pistol in his hand, and to the horror of those in sight they saw the pistol leveled on the conductor and fired. It was seen at once that the conductor was shot, for imediately he