A Mexican by the name of Quintano, who…
source date: 1889
availability: public-domain

A Mexican by the name of Quintano, who was “blowed up” in the Georgetown mines, has been discharged from the Ladies hospital. He has lost an eye and an arm, and his countenance is badly marred.