A Mr…
source date: 1888
availability: public-domain

A Mr. Gudgin, late of Zanesville, Ohio, met with what will probably prove a fatal accident at the Key Monday night. He was working in the new air shaft, which is eighty feet deep. Owing, it is supposed, to bad air in the bottom, he attempted to climb the rope to the surface, but when he came in contact with the fresh air he became exhausted and fell a distance of sixty feet. He is paralyzed from his arms down. There is not much hope for his recovery.