After three weeks of hard labor it was…
source date: 1891
availability: public-domain

After three weeks of hard labor it was found impossible to secure a United States petit jury, and the court discharged all those who had been held awaiting the formation of the jury. The grand jury was organized and George H. Utter appointed foreman.