An Enterprise representative who visited…
source date: 1891
availability: public-domain

An Enterprise representative who visited the place at 9 o’clock found the woman still alive and the coroner’s jury still waiting. Taking in the situation at a glance he hurried to town and brought a physician. Dr. Woodville. At noon the woman was brought to town and placed in the Sisters’ hospital with every prob- ability of a perfect recovery within two weeks.