Anonymous_no_
author: unknown
source date: 1891
availability: unknown

Anonymous*no* Notes: Sepia image of ten men pose in their fireman's uniform. Uniform style: Dark shirts with wide light colored collars and cuffs. Printed on the buttoned front piece "ROBERT," "1," "BLACK." Each man wears a hat bearing their title. Epaulets designate officers. Image mounted on off-white matte board. Written above and below image in black ink are the men's names: Matilda Revera, Harry Whitehill, Clarence Bayne, James Shipley, "Henry Rosencrantz, Con. Whitehill, Will Orr, Morris Terndorf, Asst Chief. Right corner of matte board is stamped "Skelly's." Verso; Written in black ink "1891." Subject: Late 19th or early 20th century photograph; New Mexico Publisher: Silver City Museum Collection: Silver City Museum