Arthur Goodell was thrown from a bucking…
source date: 1891
availability: public-domain

Arthur Goodell was thrown from a bucking horse last Friday and had his shoulder dis- located. Doctor Stephens replaced the shoulder and with the exception of a few days in a sling, the maimed member is all O.K.