At four o’clock yesterday afternoon Prof…
source date: 1891
availability: public-domain

At four o’clock yesterday afternoon Prof. Waring and Milt Miller started with a team and buggy from the Flagler works at the lower end of town, to go to the railroad depot. A short distance above the works it was necessary to cross the gulch, the water which was flowing