Bill Hubbard was a noble and a brave man,…
source date: 1891
availability: public-domain

Bill Hubbard was a noble and a brave man, and the intense interest which he took in the trial was brought about by the belief that Mrs. Hiler had been imposed upon, and that her hus- bnd in name only, would succeed in smirching her character. Could he have foretold the result of the verdict, it is likely that he would be alive today, unless he lost his mind entirely.