Bob Campbell, of Doming, fell into a 65-…
source date: 1891
availability: public-domain

Bob Campbell, of Doming, fell into a 65- foot well one night last week, from which he was extricated the next morning about daylight. With Bob’s usual luck he came through his ad- venture without a scratch. You can’t kill a good man.