by another prisoner, A1 Hefflin, who was sent…
source date: 1890
availability: public-domain

by another prisoner, A1 Hefflin, who was sent up for shooting up Georgetown. The Mexican hit by Hefflin was not hurt, and it was not supposed that the other one was badly hurt. After his time expired at the jail he was re- leased, and subsequently went to the hospital. It is understood that the case will come before the grand jury.