by falling glass f-rom the second story windows…
source date: 1889
availability: public-domain

by falling glass f-rom the second story windows. Pat Kelly, of Rincon, was badly powder burned and shook up but not badly hurt. In all nine persons were more or less hurt, not counting Mr. Walcott.