Charles Howard, the aeronaut, who made…
source date: 1891
availability: public-domain

Charles Howard, the aeronaut, who made the balloon ascension at this place in July last, was killed at Guaymas, Mexico, a week ago last Sunday. The following account of the accident is from the Bakersfield, California, Gazette.