Claudie Lewis, who was entirely too “flip”…
source date: 1889
availability: public-domain

Claudie Lewis, who was entirely too “flip” on Tuesday night, was arrested by Marshal Muse and locked up until morning when she was turned loose in time to rearrange her toilet before the trial. “Chicharo” Vega attempted to interfere in the arrest, and on Wednesday morning the marshal swore out a warrant for him.