Elizabeth Warren was 27 when she helped to…
source date: 1889
availability: public-domain

Elizabeth Warren was 27 when she helped to organize a hospital in the rough mining camp that was Silver City and assisted at the first operation there. She saw that seed grow into the fine Silver City General Hospital, and it was there 63 years later that she was taken in her final illness to die at the age of 90 after a lifetime of accomplishments.