Engineer McGinnis, bleeding, stunned and…
source date: 1891
availability: public-domain

Engineer McGinnis, bleeding, stunned and blinded by blood and injuries, showed great presence of mind by running back nearly half a mile and flagging the east-bound passenger train which was only five minutes behind them. The wreck occurred just around a sharp curve and the passenger train would have crashed into it. All trains were delayed about six hours.