Fire At Central
source date: 1890
availability: public-domain

Fire At Central On Monday night or Tuesday morning, between 12 and 1 o’clock, the store claimed by Skelly brothers, and also claimed by S. Lin- dauer, of Deming, was burned. The fire was undoubtedly of incendiary origin, as a small