FIRE AT GEORGETOWN
source date: 1891
availability: public-domain

FIRE AT GEORGETOWN The store of John A. Deemer at George- town together with the entire stock of merchan- dise was destroyed by fire on Wednesday night. Loss $15,000. Insured for $10,000. Mr. Deemer has the sympathy of many friends in this severe business reverse.