Fort Bayard, New Mexico, Alt. 6132; U.S. Public Health Service Hospital no. 55; Colonel H. E. Whitledge, Medical Officer in Charge
author: Library of Congress
source date: 1920
availability: public_domain

1 photographic print : gelatin silver ; 7.5 x 45 in. Subjects: gelatin silver prints; hospitals; new mexico; military facilities; panoramic photographs; public health service; fort bayard; united states LoC: http://www.loc.gov/item/2007664272/