From that crude beginning has grown the…
source date: 1889
availability: public-domain

From that crude beginning has grown the Silver City General Hospital, one of the most modern in New Mexico, a monument to the work of Mrs. Warren and the others who made it possible. When she was taken there, 63 years later, suffering from a broken hip, she received care and comfort and luxuries which would not have been thought possible, in that early day.