G…
source date: 1891
availability: public-domain

G. O. Smith, while out driving with his beautiful stallion, Chester, met with a slight accident. Some of the bolts came loose and the buggy box slipped off throwing Mr. Smith be- tween the wheels. The stallion shied, breaking the shafts. He ran a short distance then quieted down. Mr. Smith was bruised up a little, but escaped luckily.