GEORGE DUMPED FROM DOG CART
source date: 1891
availability: public-domain

GEORGE DUMPED FROM DOG CART While coming in from the Mangas one evening last week George D. Jones drove one wheel of his dog cart over a soap weed. The cart was upset and Mr. Jones struck the ground with some violence, causing a severe sprain of the ankle. The horse and cart seemed to be in very much of a hurry, not stopping for such a slight accident. Mr. Jones managed to hobble home, arriving about two o’clock next morning.