George Parker, a son of Thomas Parker,…
source date: 1888
availability: public-domain

George Parker, a son of Thomas Parker, of Silver City, was instantly killed at Benson last Friday night by a train backing upon him. He was a brakeman, and is said to have been a most exemplary young man.