Gila robusta Baird & Girard
author: Samuel W. Woodhouse
availability: unknown

Gila robusta Baird & Girard Pharyngeal bone #2798; reentered by error as usnm 47983, both nos. on jar as of dec 1984, found in with other specimens in alcohol, Mar 2016. R.R. Miller wrote a note in 1945 stating that these 3 specimens were the types of Gila Robusta. 8 Jul 2016 3 Subjects: Actinopterygii; Fishes; Woodhouse, S. W; Animalia; Chordata; Cypriniformes; Cyprinidae; Gila robusta Baird & Girard Location: New Mexico Via DPLA from: [object Object]