Image 11 of El Paso herald (El Paso, Tex.), May 13, 1916, (HOME EDITION)
author: Anonymous
source date: 1916
availability: public_domain

EL PASO HERALDMINING NEWS t THE IJEBBME HAS HflllK flDDEOTHPLAWT OIHfllffl ILLHIEDi 1 Capacity of Hayden Smelter Will Be Increased 50 Percent H den Arte May 1J With the ad i of a third reverberator furnace i caparltv of the AJnartoan smelling v I rfitinie companys Hayden plant i ill tr in reased percent this sum r iir The excavation for the furnace ni ihi new machinery which lta Motion will make necessary Is v jiru llcsily complete The present normal capacity of the iter is 25000 tons of ore and oon i tr te a month and for a long time ii mouihlv output of blister copper l C AAlt AAA nnunl HlnCA APT11 hm he sampling mill was burned i mi the plant has been handicapped 1 1 e null Is now being rebuilt under the rMion of J J Orrasbee the com i i ii s superintendent of construction hiI will be complete about May 0 Plan 30000 Jleercatlon Bnlldlng I ln have been drawn for a 520000 iMitiun building which will be f 1 1 for the smelters employes In mse of the summer If ajl goes 1 i iv 111 be completed by August 1