Image 11 of El Paso herald (El Paso, Tex.), May 19, 1919, (HOME EDITION)
author: Anonymous
source date: 1919
availability: public_domain

EL PASO HERALD DUTY DODGERS LOSE TO GOMEZ Many Costly Errors Aid in ueieat 01 JJOugers oat urday Afternoon VrmTCitr League Standing W L 2 Pet ioo 67 SO 509 3 3 J 004 Duty i i i nli engineers 1 dman i i i 1 i lodgers 1 supply 0 2 i rporarily At least the tdsprs are out of the running for ip tjp position of the Army and City aue percentage column a decisive a hy Juan Gomezs Mexican nine ung the damper on this clnb Sat dr afternoon at Rio Grande park t Mdered one of the strongest clubs irrjjt when the league opened i ers in the past two weeks w a failed to live up to preseason p tr poor fielding of members of team being responsible for the o of the game Saturday It may ip nen the fact that a number of if tus were tried out however caused the errors Score In First TJof until the eighth inning werei rodpere able to score off the op nc twiners who worked conslst and kept down incipient scoring u The Mexican team got one n tie first innini when Duty f J Mmjarezs