Image 2 of The Roswell daily record (Roswell, N.M.), September 10, 1909
author: Anonymous
source date: 1909
availability: public_domain

TERRITORY OF NEW MEXICO OFFICE OF THE SECRETARY CERTIFICATE OF COMPARISON I Nathan Jaffa Secretary of the Territory of New Mexico do certify tbat there was filed for record In this office at Three oclock p an on the Second day of September A D 1909 Article of Incorporation of VALLEY ELECTRICAL COMPANY No 6099 and also that I have compared the following copy of the same with the original thereof now on file and de clare It to be a correct transcript therefrom and of the whole thereof Given under my hand and the Great Seal of the Territory of New Mexico at the City of SEAL Santa Fe the Capital on this Second day of Septem ber A D 1909 NATHAN JAFFA Secretary of New Mexico Articles of Incorporation of the VALAJ3Y ELECTRICAL COMPANY Know All Men by These Presents Tbat we the undersigned citizens of the United States of America whose full names are Clyde C Cald well Roger J Gatlin Oliver H Smith Joseph J Jaffa and Krwin W Mitch ell all of the County of Chaves Terrl tory of New Mexico do hereby certify and declare that we have associated and by these presents do