Image 5 of Santa Fe new Mexican (Santa Fe, N.M.), January 12, 1907
author: Anonymous
source date: 1907
availability: public_domain

SATURDAY JANUARY 12 v 1907 SANTA FE XEW MEXICAN SANTA JTE N 31 PAGE FIVE TIMETABLE ALL LINES Entering and Leaving Santa Re compiled According to Schedules of Trains Now In Effect SANTA FE CENTRAL No 1 Southbound leaves Santa Fe 120 p m No 2 Northbound arrives Santa Fe 420 p m DENVER RIO GRANDE No 420 KastboimJ leaves Sanla Fe 11 a m No 425 Westbound arrives Santa Fe 330 p m ATCHISON TOPEKA SANTA FE Lamy Branch Arrive at Santa Fe Station No 721 940 a m No 723 C 50 p m No 725 1115 p m Depart from Santa Fe Station No 720 815 a m No 722 420 p m No 724 740 p m No 720 connects with Numbers 10 and 2 east and No 3 limited west at Lamy No 724 collects with No 1 west at Iamy No 721 connects with No 7 nnd 8 southbound and 9 west at Lamy Main Line Via Lamy No 1 stops at all stations No 7 will stop at all stations Lamy to Albuquerque to discharge passen gers from Santa Fe No 721 leaves Lamy at 940 a m and will not wait for