is supposed to be shot by the villain of the play…
source date: 1891
availability: public-domain

is supposed to be shot by the villain of the play. At the critical moment the weapon missed fire, but the actor was equal to the emergency, and exclaimed at once, “Die, then, the first victim of smokeless powder!”