It seems that Mrs…
source date: 1889
availability: public-domain

It seems that Mrs. Munger desired to rent some rooms, and was shown several by Mr. Sheridan. The last room shown her was di- rectly in the rear of Dr. Stephens’ office. Mrs. Munger claims that Sheridan insulted her. Soon after this she called Mr. Sheridan out of Hand & Beall’s office and attempted to whip him with a rawhide. Mr. Sheridan caught and held her until a crowd began to gather, when he made his escape.