James McKnight, who was hit in the head…
source date: 1888
availability: public-domain

James McKnight, who was hit in the head with a windlass at Pinos Altos about the first of July, died at the hospital Tuesday, and was buried Wednesday. He was sent to the hospital July 5th, since which time he has been insane, refusing to eat anything except by force.