Little five-year-old May Glessener, Albu-…
source date: 1889
availability: public-domain

Little five-year-old May Glessener, Albu- querque, has been suffering for a year with what her parents and physician had thought an aggravated attack of catarrh. She has been doctored for this disease during that time, but a radical change has been effected. Mrs. Glesse- ner discovered a shoe button in the right nostril of the little ones nose. She extracted the button, since which time the sufferer has lost all her symptoms of catarrh.