Main street, which was so nicely fixed at a…
source date: 1891
availability: public-domain

Main street, which was so nicely fixed at a considerable expense several months ago, is now in a worse condition if possible, than ever, owing to the recent floods, and the work will have to be done over. Cinder and ashes are hardly the proper fillings for a roadway in this locality.