Mr…
source date: 1891
availability: public-domain

Mr. Hardy felt that if he ever went into that barn he would never come out of it alive, so he made a weak excuse and started down the road, keeping a sharp lookout. The old man was much enraged, and just as Mr. Hardy stepped out of view he saw his host enter the barn.