Mr…
source date: 1891
availability: public-domain

Mr. Bush, who broke his arm about two weeks ago by falling from a mowing machine, is getting along splendidly. He set the broken limb himself and to all appearances made an excellent job of it. He has been peculiarly un- fortunate in respect to broken limbs, as he had one of his legs broken on two different occasions a few years ago and for want of a surgeon set the fractured limb himself and with a degree of success that some surgeons might well be proud of.