Mr…
source date: 1891
availability: public-domain

Mr. Perez stated also that Gardner's de- ■ scription of the great fissure in the bed of the I Colorado river is correct, but that it occurred I late in the evening instead of in the forenoon, 1 and that, although the river flows into the un- 1 fathomed crevice, considerable water flows on I each side of it and down to the gulf of Cali- I fornia. I