Mrs…
source date: 1889
availability: public-domain

Mrs. Thomas Lyons was brought in from the White House Tuesday night, badly hurt, having been kicked in the stomach by a vicious horse. The force of the kick knocked the lady clear off her feet and hurled her eight or ten feet. She is recovering from the blow rapidly, and will soon be on the streets.