Mrs…
source date: 1891
availability: public-domain

Mrs. Pheby, the aged mother of Thomas B. and James Pheby and Mrs. Frank Lenoir, of Georgetown, died at the residence of her daugh- ter there, on Friday last, April 17. The burial took place at Georgetown on Sunday, Rev. R. E. Pierce officiating at the funeral. “Grandma” Pheby was a noble, true woman who had grandly filled her mission on earth and goes to the reward of the righteous and just. Rest in peace. — Sentinel.