Now the reader by this time I have no…
source date: 1891
availability: public-domain

Now the reader by this time I have no doubt has come to the conclusion that I was a tenderfoot and a badly scared tenderfoot at that and that the terrible crowd of ruffians were merely a crowd of honest miners as harmless as kittens. Wait, my friends, wait till I get through before you form an opinion.