“O, good Heavenly Father I know that I…
source date: 1891
availability: public-domain

“O, good Heavenly Father I know that I have been a very naughty, naughty girl, but oh ! dear, I am so very thirsty, and mamma, and papa and the baby all want to drink so much. Do, good God give us water, and I will never, never be naughty again.”