On examination there was found to be eight…
source date: 1891
availability: public-domain

On examination there was found to be eight knife wounds, only three of which were of any serious depth, the others being mere scratches. The knife being dull and the clothing which the woman wore, were what saved her life. The villain’s intent was good.