On her return she pulled the wrong curtain…
source date: 1891
availability: public-domain

On her return she pulled the wrong curtain aside and placed the plaster upon the stomach of the senseless, drunken drummer. Then she went to the lavatory, washed her hands and returned to her berth, getting into the right sec- tion and finding Mr. W. asleep.