ORE SAMPLE AT BANK
source date: 1891
availability: public-domain

ORE SAMPLE AT BANK A beautiful sample of chloride and bromide of silver ore is on exhibition at the First National Bank. The ore was taken from a depth of 46 feet on the Rescue mine between Pinos Altos and Central. The ore is increasing in size and value with every foot sunk on the mine ; at 22 feet the first class ore assayed 130 ounces; at 30 feet 186 ounces; at 40 feet 977 ounces; at 46 feet it runs 1382 ounces per ton in silver. The property is owned by Judge J. Crockett Givens of Central and promises to make him a bonanza prince.