Peter Mungall sworn…
source date: 1891
availability: public-domain

Peter Mungall sworn. We had been drink- ing whiskey all the afternoon at my house. I took whiskey up a couple of times. Some one suggested that we get more whiskey. Reached the house about 3 o’clock. I had whiskey at the house. There were four of us — Campbell, the two Kerrs and myself. Campbell had gone for water, and not returning. I started out about dusk to hunt him. I took a bottle with me. I recollect nothing more until I was awakened by Campbell. I was lying in the bed. Campbell and I lifted Jimmy into bed.