Quite a serious accident befell Mrs…
source date: 1891
availability: public-domain

Quite a serious accident befell Mrs. Pheby, mother of Thos. Pheby, on the Rio Mimbres. On descending a flight of stairs, Mrs. Pheby missed her footing and fell, and besides suffer- ing from severe contusions, broke one of her limbs. Owing to her advanced age — 75 years — the accident may prove to be quite a serious one.