Sadie Ray, who on the 10th, hit Frank…
source date: 1889
availability: public-domain

Sadie Ray, who on the 10th, hit Frank Murray on the head with a beer faucet, was sent to the county jail for two months. Frank had been drinking and after being hurt fled to the hills, and has not since been heard from. The people have hunted the hills over, but so far can find no trace of him, although a liberal reward in money has been offered for his dis- covery. He was badly hurt and it is feared that he may have wandered off into the hills and