same train on which he was shot, arriving there…
source date: 1891
availability: public-domain

same train on which he was shot, arriving there about 1:30 p.m. He was placed in the hands of skullful company surgeons, but their work was of no avail, as he died at 4:30 p.m., two bullets passing through his head.