Serna then fell on the ground pretending…
source date: 1889
availability: public-domain

Serna then fell on the ground pretending to be dead and two more shots were fired at him. He then arose and firing, shot his adver- sary who only lived a few hours. Before he died he made a dying confession, and in it stated that Pedro Miranda had hired him to kill Serna.