Shot Dead
source date: 1891
availability: public-domain

Shot Dead Dr. Charles L. Mason, of Kingston, was shot dead last week by J. B. Hiler, proprietor of the Mountain Pride hotel at Kingston. The Kingston Shaft gives the following meagre par- ticulars :