Further: From the sworn statements of…
source date: 1890
availability: public-domain

. Further: From the sworn statements of the constable of Precinct No. 11, in regard to the condition of the jail at Deming, we recom- mend to the immediate attention of the county commissioners the want of ventilation in said jail, that the same be attended to at once and ( 34 ) means of ventilating and protecting with grat- ings, where the same may be necessary, be undertaken at once. A. A. Ault Calvin Herring T. W. Holson Committee To the foreman of the Grand Jury: Your committee appointed to examine the conditions of the Ladies Hospital and the Sis- ters of Charity Hospital, beg leave to submit the following report: 1st. We find the hospitals to be in good condition, everything about the premises being clean and nicely kept. We inquired of the patients as to the treat- ment received and were informed that they were well satisfied and had nothing to com- plain of. We find there are two county patients and eight pay patients at present confined in the wards of the Ladies Hospital and two pay pa- tients in the Sisters of Charity Hospital. We further submit the report of Mrs. O. S. Warren, secretary of the Ladies Hospital, as to financial condition of same, and also the statement of the Sisters of Charity. William H. Durkee John W. Fleming John A. Menard Committee